Meson Production on the Neutron at ANKE

Identification of Spectator Protons

T_{sp} = 2.5 − 30 MeV

pn → dπ^0 at 500 MeV

Identification of 2 GeV/c Deuterons

• forward Čerenkov counters ⇒ 95% proton suppression • energy loss in the forward-scintillator hodoscope

pn → dω at 2 GeV

available statistics 95% proton suppressed by Čerenkov counters