Bumps with maxwell and mymax at phi=0.25, z=50

-67.5

-65

-62.5

-60

-57.5

-55

-52.5

-50

500 520 540

2002/03/25 12.19

r (mm)

Er (V/mm) black blue red - (31) maxwell auto mesh - (54) maxwell manual mesh - (64) mymax

typical execution time: maxwell 140 CPUh mymax 14 CPUh

-1.25

-1

-0.75

-0.5

-0.25

0

0.25

500 750 1000 1250

r (mm)

Ephi (V/mm)

-0.05

0

0.05

0.1

0.15

500 750 1000 1250

r (mm)

Ez (V/mm)